H1 Preliminary Data PHOJET 1.04

PYTHIA 5.722 (with MIA) PYTHIA 5.722 (without MIA)

10

10^2

10^3

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

d^2σ/dp_⊥ dy [nb/GeV/c]

-2.8 ≤ y ≤ -2.4

10

10^2

10^3

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

-2.4 ≤ y ≤ -2.0

10^2

10^3

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

-2.0 ≤ y ≤ -1.4

p_⊥ [GeV/c]