H1 preliminary

10

20

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

LL

CTEQ4D MRST GRV χ^2

10

20

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

LR χ^2

10

20

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

VV χ^2

10

20

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

AA χ^2

10

20

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1 VA η/4π (TeV ^{-2}) χ^2