0 0.02

0.04

0.06

40000000000 2

0 0.02

0.04

0.06

3 4

0.02

0.04

0.06

3 4

0 0.02

0.04

0.06

3 4

0 0.02

0.04

0.06

3 4

0 0.02

0.04

0.06

3 4

0 0.02

0.04

0.06

3 4 0 0.02

0.04

0.06

3 4

0^{Q2 = 14.8 GeV1}

x = 0.76 E-03

6^{Q2 = 40.9 GeV2}

x = 2.6 E-03

2^{Q2 = 6.9 GeV2}

x = 0.43 E-03 4

Q^2 = 14.3 GeV^2 x = 0.99 E-03 5

Q^2 = 30.3 GeV^2 x = 0.97 E-03

1^{Q2 = 6.4 GeV2}

x = 0.16 E-03 3

Q^2 = 12.8 GeV^2 x = 0.4 E-03 H1 1996 Preliminary

LEPTO-D

ARIADNE-D

0 0.02

0.04

0.06

3 4