mod. Durham algorithm, 575 < Q^2< 5000 GeV^2

0.11 0.12 0.13 0.14

α_s(M_Z ^2)

α_s(M_Z ^2) = 0.1143

had. energy scale + 4Ψ

+0.0059 had. energy scale − 4Ψ

−0.0067 elm. energy scale + 3Ψ

+0.0014 elm. energy scale − 3Ψ

−0.0015

+0.0004 −0.0035 detector correction

+0.0058 −0.0055 hadronization correction

+0.0008 −0.0054

PDFs

+0.0045 −0.0031 μ_R^2 = 4, 1/4 Q^2

μ_R^2 = Λ E_T^{Breit} Γ^2

−0.0023

statistical error

−0.0044 +0.0044

H1 preliminary