0.08

0.1

0.12

0.14

0.16

0.18

0.2

0.22

0.24

10^2 10^3

ΛE_TΓ^2 [GeV^2] α_s(ΛE_TΓ^2)

hadr. energy scale e.m. energy scale μ_R^2 = 1/4, 4 ΛE_TΓ^2

H1 preliminary