modified Durham algorithm, y_2 Γ 0.001

0 0.0025

0.005

0.0075

0.01

0 20 40 60 80 100 120 140

θ_{fwd}

1/N_{DIS} dn/dθ_{fwd}

150 Λ Q^2 Λ 275 GeV^2

0

0.005

0.01

0.015

0 20 40 60 80 100 120 140

θ_{fwd}

1/N_{DIS} dn/dθ_{fwd}

275 Λ Q^2 Λ 575 GeV^2

0

0.01

0.02

0 20 40 60 80 100 120 140

θ_{fwd}

1/N_{DIS} dn/dθ_{fwd}

575 Λ Q^2 Λ 5000 GeV^2

H1 preliminary data

LEPTO 6.5 LEPTO 6.5.2 β