fac. k_T algorithm, 150 < Q^2< 275 GeV^2

0.11 0.12 0.13 0.14

α_s(M_Z ^2)

α_s(M_Z ^2) = 0.1272

had. energy scale + 4Ψ

+0.0071 had. energy scale − 4Ψ

−0.0051 elm. energy scale + 3Ψ

+0.0052 elm. energy scale − 3Ψ

−0.0019

+0.0024 −0.001 detector correction

+0.0054 −0.0057 hadronization correction

+0.0042 −0.0069

PDFs

+0.0071 −0.0053 μ_R^2 = 4, 1/4 Q^2

μ_R^2 = Λ E_T Γ^2

+0.0016

statistical error

+0.0031 −0.003

H1 preliminary