H1 96-97

1

10

1 10 10^2 10^3

Q^2/GeV^2

F_2^{p x=5E-05(x 46)}

F_2^{p x=8E-05}_{(x 35)}

F_2^p_{x=0.00013}

(x 25)

F_2^p

x=0.0002 (x 18) x=0.00032 (x 12) x=0.0005 (x 8) x=0.0008 (x 5.5)

x=0.0013 (x 3.8)

x=0.002 (x 2.5) x=0.0032 (x 1.8) x=0.005 (x 1.3) x=0.008 (x 1)

H1 96-97 prel. H1 94-97 NMC H1 QCDFit prel. QCDFit incl. BCDMS