H1 96-97

0

2.5

5

7.5

10

12.5

15

17.5

20

22.5

10^{-4} 10^{-3} 10^{-2} 10^{-1} x xg(x,Q^2)

Q^2=5 GeV^2

Q^2=20 GeV^2

Q^2=200 GeV^2

H1 prel. exp thy ⊕