H1 Low x

10

10^2

10^3

1 10 10^2 10^3 10^4

Q^2/GeV^2

F_2^{x=0.00005(x 2000)}

F_{2 x=0.00008}

(x 1380)

F_2

x=0.00013 (x 920)

x=0.0002 (x 620)

x=0.00032 (x 410)

x=0.0005 (x 275)

x=0.0008 (x 190)

x=0.0013 (x 135)

x=0.002 (x 95)

x=0.0032

(x 70)

x=0.005 (x 53)

x=0.008 (x 40)

x=0.013 (x 30)

x=0.02 (x 23)

x=0.032 (x 17)

x=0.05 (x 13)

x=0.08 (x 10)

x=0.13 (x 7.5)

H1 96-97 prel.

H1 94-97 (e^+)

NMC

H1 QCD fit