) [GeV] π M (p

1.08 1.09 1.1 1.11 1.12 1.13 1.14 1.15 1.16

Entries/MeV

0

200

400

600

800

1000

1200

-π p →Λ 182 ± = 6946

-πpN

H1 Preliminary