η -1.5 -1 -0.5 0 0.5 1 1.5

MC/Data

0.6 0.8 1 1.2 1.4-1.5 -1 -0.5 0 0.5 1 1.5

[pb] η/dσd

10 20 30 40 50 60 70 80 90

H1 Data Λ+Λ =0.220) sλ CDM ( =0.220) sλ MEPS ( =0.286) sλ CDM ( =0.286) sλ MEPS (

H1 Preliminary