0.00

0.25

0.50 Q^2 = 1.5 GeV^2

(1.8) (2.5)

F_2^c in the NLO DGLAP scheme

fit to F_2

H1 NLO QCD H1 ZEUS

ZEUS semil prel

3.5 GeV^2 (4) 6.5 GeV^2 (7) (6.5)

0.00

0.40

12 GeV^2 (11) (12)

18 GeV^2 (20)

25 GeV^2 (30) (32.5)

-5 -4 -3 -2 -1

0.00

0.40

60 GeV^2 (60) (55)

F_2^c

-5 -4 -3 -2 -1

130 GeV^2 (100)

-5 -4 -3 -2 -1 0

565 GeV^2

log x