1 10^1 10^2

Q^2 Μ GeV^2Ν

10^{-2}

10^{-1} 1 10^1

10^2

10^3

10^4

10^5

10^6

10^7

F_2^c

F_2^c in the NLO DGLAP scheme

x=0.00005 (*4^{11})

H1 ZEUS H1 NLO QCD

fit to F_2

x=0.00013 (*4^{10}) x=0.0002(*4^9) x=0.0003(*4^8) x=0.0005(*4^7) x=0.0008 (*4^6) x=0.0012 (*4^5) x=0.002(*4^4) x=0.0032(*4^3)

1 x=0.004(*4^2) x=0.008(*4^1) x=0.02(*4^0)