0

20

40

60

80

100

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1 e^-p Data (Prelim. 16 pb^{-1}) e^-p SM Ρs=320 GeV e^-p SM (MC) Ρs=320 GeV (50 pb^{-1})

e^+p Data (48 pb^{-1}) e^+p SM Ρs=300 GeV e^+p SM (MC) Ρs=300 GeV (50 pb^{-1})

P σ^{CC}_{TOT} (Q^2 Γ 200 GeV^2) (pb)