ZEUS H1 αs 0.1172 prelim. 0.1150

errors: ± 0.0008(stat)

± 0.0054(syst) ± 0.0017 (exp) +0.0009 −0.0005 (model)

sum: 0.0055 0.0021

scales: ? ≈ 0.005

μ_r = 0.25 μ_r = 1 μ_r = 4 μ_f = 0.25 −0.0038 −0.0001 +0.0043 μ_f = 1 −0.0055 −− +0.0047 μ_f = 4 −− +0.0005 +0.0063 analysis uncertainty +δ α_s -δ α_s Q^2_{min} = 2 GeV^2 0.00002 Q^2_{min} = 5 GeV^2 0.00016 parameterisations 0.00011 Q^2_0 = 2.5 GeV^2 0.00023 Q^2_0 = 6 GeV^2 0.00018 y_e < 0.35 0.00013 x < 0.6 0.00033 y_μ > 0.4 0.00025 x > 5 · 10^{−4} 0.00051 uncertainty of u − d 0.00005 0.00005 strange quark contribution ϵ = 0 0.00010 m_c + 0.1 GeV 0.00047 m_c − 0.1 GeV 0.00044 m_b + 0.2 GeV 0.00007 m_b − 0.2 GeV 0.00007 total uncertainty 0.00088 0.00048