0 0.25 0.5 0.75 1 1.25 1.5 1.75

10^{-1} 1 x xG_3 x x

BCDMS 40 Λ Q^2 Λ 180 GeV^2 ZEUS 1500 Λ Q^2 Λ 30000 GeV^2 H1 (E. Rizvi, T. Sloan Vol. 3, Issue C1, pp1-5 EPJdirect) e^Αp SM Q^2 = 1500 GeV^2 μN SM Q^2 = 100 GeV^2