H1 + ZEUS

10^{-1}

1

10

10^2

10 10^2

Fit with W^δ FKS (CTEQ4M) MRT (CTEQ5M)

ZEUS (prel.) DIS 96-99 ZEUS (prel.) BPC 99-00 ZEUS (prel.) PHP H1 DIS 95-97 H1 PHP

Q^2 = 0 GeV^2

0.4 GeV^2

3.1 GeV^2

6.8 GeV^2

16. GeV^2

(Ξ 1)

(Ξ 0.2)

(Ξ 0.1)

(Ξ 0.05)

(Ξ 0.03)

W ΜGeVΝ σ_{tot}(γ^*p5J/ψp) ΜnbΝ

0

1

2

0 5 10 15

Q^2 ΜGeV^2Ν δ