H1 ZEUS(prel.), ρ^0 fixed target, ρ^0 H1 ZEUS(prel.), J/ψ

W^{0.22}

W^{0.8}

W^{0.4}

W^{0.8} σ(γp 5 ρp)

σ(γ^*p 5 ρp), Q^2=3.1 GeV^2 Q^2=3.5 GeV^2

σ(γ^*p 5 ρp), Q^2=8.3 GeV^2 Q^2=10.9 GeV^2 Q^2=19.7 GeV^2 Q^2=27.0 GeV^2 σ(γp 5 J/ψp)

W (GeV) cross section (μb)

10^{-3}

10^{-2}

10^{-1}

1

10

1 10 10^2