)^2

(GeV 2Q 310^410

CTEQ6D 2 /dQ σ / d^2 /dQ σd

0.6 0.8 1 1.2 1.4 )^{-1}

H1 Quark Radius Limit HERA I+II (435 pb p+e

Normalisation Uncertainty PDF Uncertainty m (95% CL) -18 10⋅ = 0.74 qR

)^2

(GeV 2Q 310^410 0.6 0.8 1 1.2 1.4

H1 Preliminary p-e