| _{γtu}κ|

-110 1

| tuZv|

-110

1

|

1

= 0 tcZ = v γtcκ = 175 GeV tm

H1 Preliminary (HERA I+II) Excluded

Excl. by ZEUS Excl. by CDF

Excl. by L3