Erratum to Nucl.Phys.B468 (1996)3:

In the comparison of J/ψ and ρ meson production, the errors in the ratio of the J/ψ : ρ cross section given in the text at the end of section 7.1 are incorrect. The correct values are as follows:

ratio stat. sys.

0.64 � 0.24 � 0.12 at Q^2 = 10 GeV^2

1.3 � 0.4 � 0.2 at Q^2 = 20 GeV^2