Errata: DESY 98-087

1. Due to an administrative mistake when preparing the final version for the red DESY report DESY 98-087 the figure 4 b) on page 11 has to be replaced by the following one.

( b )

2. The right preprint number for reference 9 is DESY 98-075 instead of DESY 98-076.