Erratum: DESY 98-204

The cross sections in Figs. 5 b,c,d were mistakenly plotted with a scaling factor 1/(2BR(c ! D^�X)) = 1/0.54, which is inconsistent with captions and text. They must therefore be replaced by the �gures below, which are identical with the original ones, except for this scaling factor having been removed.

b)

c)

d)