0

10

20

30

40

50

60

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

HERA II

H1 (prel.) H1 ZEUS (prel.) ZEUS SM (MRST) Linear fit

Q^2 Γ 400 GeV^2 y Λ 0.9

P σ^{CC} (pb) e^+p → ν^_X